\documentclass[letterpaper]{report}
\usepackage{makeidx}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{multicol}
\usepackage{float}
\usepackage{textcomp}
\usepackage{alltt}
\usepackage{times}
\usepackage{lastpage}
\usepackage{color}
\definecolor{QNXBlue}{rgb}{0.0,0.05,0.47}

\ifx\pdfoutput\undefined
  \usepackage{hyperref}
  \usepackage{pspicture}
\else
  \usepackage[pdftex]{hyperref}
  \hypersetup{
    pdftitle    = {$projectname},
    pdfauthor   = {QNX Wavemakers},
    pagebackref = true,
    colorlinks  = true,
    linkcolor   = blue
  }
\fi
\usepackage{doxygen}
\makeindex
\setcounter{tocdepth}{3}
\setcounter{secnumdepth}{6}
\newcommand{\QNX}{\textcolor{QNXBlue}{\textbf{{\Huge Q}\huge NX}}}
%\renewcommand{\clearemptydoublepage}{\cleardoublepage}
\addtolength{\headheight}{0.5cm}
\fancypagestyle{plain}{%
  \fancyhead[l]{QWA -- QNX Aviage Acoustic Processing 1.1\\
}
}
\pagestyle{plain}


\begin{document}
\begin{titlepage}
%  \hspace*{\fill}
  \vspace*{7cm}
  \begin{center}
    {\huge QWA -- QNX Aviage Acoustic Processing }\\
    \vspace*{1cm}
    {\Large Documentation}\\
    \vspace*{1cm}
    {\Large Version: $projectnumber}\\
    \vspace*{\fill}
  \end{center}
\end{titlepage}
\clearemptydoublepage

\pagenumbering{roman}
\tableofcontents
\clearemptydoublepage

\pagenumbering{arabic}
